100

1000

10000

50

60

70

80 90

200

300

400

500

600

700

800 900

2000

3000

4000

5000

6000

7000

8000

9000

0 180 180 360

90 90 270 270

10 170 190 350

20 160 200 340

30 150 210 330

40 140 220 320

50 130 230 310

60 120 240 300

70 110 250 290

80 100 260 280

0 100 200 300 400 500 600 700 800 900 1000

1100

1200

1300

1400

1500

1600

1700

1800

1900

2000

2100

2200

2300

2400

2500

2600

Distance from 0.1 mV/m Contour in Miles

Millivolts per meter at 1 mile - mV/m @ 1 mi

Azimuth

Figure 11, Section 73.190

Permissible Daytime Radiation

for Class B or Class D Stations Subject To Section 73.187 1600 kHz